Adeus!

Auta de Souza

“Espera, eu voltarei.” Ele dizia (Quanto era triste o seu olhar tão doce!) Chorosa e terna a fala lhe tremia Como se a corda de algum’harpa fosse.

E ela, a pálida noiva estremecida, Fitou no amado os grandes olhos seus, E murmurou, baixinho e comovida, Quase a chorar e muito a medo: Adeus!